(GeV/c) Tp 0 2 4

AuAu / (dAu fit) R

0

0.5

1

1.5 ±μ_± e

>_tβ , < foT BW1: 220, 0.23 BW2: 129, 0.48 BW3: 100, 0.6

sys. error binN

c+b reso.+frag.

c+b coll.